x

F_2^γ (x,uds) / α

SaS1D (IP2=2) GRS Q^2 = 30 GeV^2 P^2 = 0,0.05,0.5,1,5 GeV^2

0

0.1

0.2

0.3

0.4

0.5

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1