0

0.5

1

1.5

2

2.5

-6 -4 -2 0 2 4 6 η=−ln(tan(θ^//2))

Energy Flow 1/N dE/dη ΜGeVΝ

Tag Direction

Beam Pipe

Forward Region

Endcap

Barrel

Endcap

Forward Region

Beam Pipe