0

1

2

3

4

5

6

7

8

-6 -4 -2 0 2 4 6

OPAL ΛQ^2Γ = 135 GeV^2

Corrected Data F2GEN pointlike F2GEN perimiss HERWIG PYTHIA

η=−ln(tan(θ^//2))

Energy Flow 1/N dE/dη ΜGeVΝ