0

0.25

0.5

0.75

1

1.25

1.5

1.75

2

1 10 10^2 10^3

Q^2 ΜGeV^2Ν

F^γ_2(Q^2)/α + offset

(a)

offset = N*0.45 N x range

2 0.6-0.85

1 0.25-0.6

0 0.1-0.25

OPAL GRSc SAS1D

WHIT1 QPM