0

100

200

300

400

500

600

700

800

1 10 10^2

W ΜGeVΝ σ_{γγ} ΜnbΝ

OPAL L3 MD-1 TPC/2γ PEP/2γ PLUTO

σ_{γp}^2 /σ_{pp} Schuler and Sj�strand Engel and Ranft (PHOJET) eikon. mini-jet model