200

400

600

0 20 40 60 80 100 120 140

200

400

600

0 20 40 60 80 100 120 140

(a) σ_{γγ} = 156*s^{0.095} + 0.0*s^{0.418} + 320*s^{-0.34} nb ε_1 = 0.093, 0.097 X_{1γγ} = 138, 174 nb

OPAL (161-183 GeV)

(b)

Y_{1γγ} = 190, 450 nb

η_1 = 0.032, 0.036 X_{2γγ} = 0.5, 1.0 nb

W ΜGeVΝ σ_{γγ} ΜnbΝ

(c)

OPAL (161-183 GeV) L3 (133-161 GeV)

L3 (189 GeV Pythia) L3 (189 GeV Phojet) 200

400

600

0 20 40 60 80 100 120 140